DHRYSTONE (1) Eighth Edition DHRYSTONE (1)

NAME

dhrystone - integer benchmark

SYNOPSISS

dhrystone

EXAMPLES dhrystone # Run the dhrystone benchmark

DESCRIPPTION Many years ago, a floating-point benchmark called whetstone was popular for benchmarking FOR- TRAN programs. Nowadays, an integer benchmark called dhrystone is widely used for benchmarking UNIX systems. This is it. Be warned, however, thatdhrystone is entirely CPU bound, and goes blindingly fast on machines with high-speed caches. Although this is a good measure for programs that spend most of their time in some inner loop, it is a poor benchmark for I/O bound applications.

Page 1 September 3, 1999