ECHO(1) Eighth Edition ECHO (1)

NAME

echo - print the arguments

SYNOPSISS

echo [-n] argument ...

OPTIONS

- n No linefeed is output when done

EXAMPLES echo Start Phase 1 # ’StartPhase 1’ is printed

echo - n Hello # ’Hello’ is printed without a linefeed

DESCRIPPTION Echo writes its arguments to standard output. They are separated by blanks and terminated with a line feed unless -n is present. This command is used mostly in shell scripts.

SEE AALSO

sh(1).

Page 1 September 3, 1999