READALL(1) Eighth Edition READALL(1)

NAME

readall - read a device quickly to check for bad blocks

SYNOPSISS

readall [- bt] file

OPTIONS

- b Produce shell script onstdout that calls badblocks

- t Just print devicesize

EXAMPLES readall /dev/hd0 # Read allof /dev/hd0

readall -b /dev/hd1 >s # Generateshell script ons

DESCRIPPTION Readall reads allof the named device in large chunks. It reports aboutblocks that it cannot read. Unlike diskcheck, it does not attempt to write on the disk, making it safer to use when one is worried about a sick system. When the - b flag is given, the output is a shell script that calls the badblocks program to marked all the bad blocks. Whenever installing MINIX, it is wise to run readallwith the - b flag first on all the hard disks.

SEE AALSO

badblocks (8).

Page 1 September 3, 1999