SLEEP (1) Eighth Edition SLEEP(1)

NAME

sleep - suspend execution for a given number of seconds

SYNOPSISS

sleep seconds

EXAMPLES sleep 10 # Suspend execution for 10sec.

DESCRIPPTION The caller is suspended for the indicated number of seconds. This command is typically used in shell scripts.

SEE AALSO

sleep(3).

Page 1 September 3, 1999