SIGSUSPEND (2) Eighth Edition SIGSUSPEND (2)

NAME

sigsuspend - suspend until signalled

SYNOPSISS

#include <signal.h>

int sigsuspend(const sigset_t *set)

DESCRIPPTION Sigsuspend() installs the signal mask referenced by set and suspends the process until signalled. The signal is handled, the signal mask is restored to the value it had before the sigsuspend() call and call returns.

SEE AALSO

pause (2),sigaction(2), sigpending (2),sigprocmask (2),sigset(3).

DIAGNOSTICCS Sigsuspend() never returns normally, so it always returns - 1. The error code is either EINTR indicating that a signal has arrived, or EFAULT for a badset address.

AUTHOR

Kees J. Bot (kjb@cs.vu.nl)

Page 1 September 3, 1999