TIME (2) Eighth Edition TIME (2)

NAME

time, stime - get/set date and time

SYNOPSISS

#include <sys/types.h> #include <time.h>

time_t time(time_t *tp) int stime(time_t *tp)

DESCRIPPTION The system’s notion of the current Greenwich time is obtained with the time call, and set with the stime call. The time is expressed in seconds since midnight (0 hour), January 1, 1970. The time is both returned by time and stored in the variable pointedto bytp unless tp is thenull pointer.

Stime obtains the time to set from the variable pointedto bytp.

Only the super-user may set the time of day.

RETURN

A 0 return value from stime indicates that the call succeeded. Time returns the current time on success. A - 1 return value indicates an error occurred, and in this case an error code is stored into the global variable errno.

ERRORS

The following error codes may be set in errno:

[EFAULT] The tp address referenced invalid memory.

[EPERM] A user other than the super-user attempted to set the time.

SEE AALSO

date(1), ctime(3).

Page 1 (May 14, 1986) September 3, 1999