EXIT (3) Eighth Edition EXIT (3)

NAME

exit, atexit - terminate a process after flushing any pending output

SYNOPSISS

#include <stdlib.h>

void exit(int status) int atexit(void (*func)(void))

DESCRIPPTION Exit first calls all functions registered by atexit, flushes all data buffered by the Standard I/O library, and finally terminates the process. Exit never returns.

Atexit registers thefunction func into a table of functions to be called on exit.

SEE AALSO

exit(2).

DIAGNOSTICCS Atexit returns 0 on success, - 1 if malloc cannot allocate more memory for the list of registered functions.

Page 1 (May 12, 1986) September 3, 1999