FERROR(3) Eighth Edition FERROR(3)

NAME

ferror, feof, clearerr, fileno - stream status inquiries

SYNOPSISS

#include <stdio.h>

int feof(FILE *stream) int ferror(FILE *stream) int clearerr(FILE *stream) int fileno(FILE *stream)

DESCRIPPTION Feof returns non-zero when end of file is read on the named input stream, otherwise zero. Unless cleared byclearerr, the end-of-file indication lasts until the stream is closed.

Ferror returns non-zero when an error has occurred reading or writing the named stream, otherwise zero. Unless cleared by clearerr, the error indicationlasts until the stream is closed.

Clearerr resets theerror and end-of-file indicators onthe named stream.

Fileno returns the integer file descriptor associated with thestream , see open(2).

Currently all of these functions are implemented as macros; they cannot be redeclared.

SEE AALSO

fopen(3), open(2).

Page 1 (May 14, 1986) September 3, 1999