GETPASS (3) Eighth Edition GETPASS (3)

NAME

getpass - read a password

SYNOPSISS

#include <minix/minlib.h>

char *getpass(const char *prompt)

DESCRIPPTION Getpass reads a password from the file /dev/tty , or if that cannot be opened, from the standard input, after prompting with the null-terminated string prompt and disabling echoing. A pointer is returned to a null-terminated string of at most 32 characters, excluding the null.

SEE AALSO

crypt (3).

BUGS

The return value points to static data whose content is overwritten by each call.

Page 1 (May 15, 1985) September 3, 1999