RAND( 3) Eighth Edition RAND (3)

NAME

rand, srand - random number generator

SYNOPSISS

#include <stdlib.h>

void srand(unsigned seed) unsigned rand(void)

DESCRIPPTION Rand uses a multiplicative congruential random number generator with period 2^{32} to return successive pseudo-random numbers in the range from 0 to RAND_MAX.

The generator is reinitialized by calling srand with 1 as argument. It can be set to a random starting point by calling srand with whatever you like asargument.

SEE AALSO

random (3).

Page 1 ( September 29, 1985) September 3, 1999